0

2

0 1000 2000 3000 4000 5000

χ^2

0

2

0 1000 2000 3000 4000 5000

δϕ_{FWHM} (deg)

-8

0

8

0 1000 2000 3000 4000 5000

x_b (mm)

-6

0

6

0 1000 2000 3000 4000 5000

y_b (mm)

0

5

10

0 1000 2000 3000 4000 5000

δx_{b,FWHM} (mm)

-9

0

9

0 1000 2000 3000 4000 5000

x_b^, (mrad)

-6

0

6

0 1000 2000 3000 4000 5000

time (ms) y_b^, (mrad)

0

2

0 1000 2000 3000 4000 5000

χ^2

0

2

0 1000 2000 3000 4000 5000

δϕ_{FWHM} (deg)

-8

0

8

0 1000 2000 3000 4000 5000

x_b (mm)

-6

0

6

0 1000 2000 3000 4000 5000

y_b (mm)

0

5

10

0 1000 2000 3000 4000 5000

δx_{b,FWHM} (mm)

-9

0

9

0 1000 2000 3000 4000 5000

x_b^, (mrad)

-6

0

6

0 1000 2000 3000 4000 5000

time (ms) y_b^, (mrad)

0

2

0 1000 2000 3000 4000 5000

χ^2

0

2

0 1000 2000 3000 4000 5000

δϕ_{FWHM} (deg)

-8

0

8

0 1000 2000 3000 4000 5000

x_b (mm)

-6

0

6

0 1000 2000 3000 4000 5000

y_b (mm)

0

5

10

0 1000 2000 3000 4000 5000

δx_{b,FWHM} (mm)

-9

0

9

0 1000 2000 3000 4000 5000

x_b^, (mrad)

-6

0

6

0 1000 2000 3000 4000 5000

time (ms) y_b^, (mrad)

0

2

0 1000 2000 3000 4000 5000

χ^2

0

2

0 1000 2000 3000 4000 5000

δϕ_{FWHM} (deg)

-8

0

8

0 1000 2000 3000 4000 5000

x_b (mm)

-6

0

6

0 1000 2000 3000 4000 5000

y_b (mm)

0

5

10

0 1000 2000 3000 4000 5000

δx_{b,FWHM} (mm)

-9

0

9

0 1000 2000 3000 4000 5000

x_b^, (mrad)

-6

0

6

0 1000 2000 3000 4000 5000

time (ms) y_b^, (mrad)

0

2

0 1000 2000 3000 4000 5000

χ^2

0

2

0 1000 2000 3000 4000 5000

δϕ_{FWHM} (deg)

-8

0

8

0 1000 2000 3000 4000 5000

x_b (mm)

-6

0

6

0 1000 2000 3000 4000 5000

y_b (mm)

0

5

10

0 1000 2000 3000 4000 5000

δx_{b,FWHM} (mm)

-9

0

9

0 1000 2000 3000 4000 5000

x_b^, (mrad)

-6

0

6

0 1000 2000 3000 4000 5000

time (ms) y_b^, (mrad)