September 95 data taken in flattop 2250MeV/c, 25ms time bins

0

1

2

0 500 1000 1500 2000 2500 3000 3500 4000

δϕ_{FWHM} (deg)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

y_b (mm)

0

2

4

0 500 1000 1500 2000 2500 3000 3500 4000

δx_{b,FWHM} (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b^, (mrad)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

time (ms) y_b^, (mrad)

September 95 data taken in flattop 2250MeV/c, 50ms time bins

0

1

2

0 500 1000 1500 2000 2500 3000 3500 4000

δϕ_{FWHM} (deg)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

y_b (mm)

0

2

4

0 500 1000 1500 2000 2500 3000 3500 4000

δx_{b,FWHM} (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b^, (mrad)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

time (ms) y_b^, (mrad)

September 95 data taken in flattop 2250MeV/c, 100ms time bins

0

1

2

0 500 1000 1500 2000 2500 3000 3500 4000

δϕ_{FWHM} (deg)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

y_b (mm)

0

2

4

0 500 1000 1500 2000 2500 3000 3500 4000

δx_{b,FWHM} (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b^, (mrad)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

time (ms) y_b^, (mrad)

September 95 data taken in flattop 2250MeV/c, y‘ not fitted, 25ms time bins

0

1

2

0 500 1000 1500 2000 2500 3000 3500 4000

δϕ_{FWHM} (deg)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

y_b (mm)

0

2

4

0 500 1000 1500 2000 2500 3000 3500 4000

δx_{b,FWHM} (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b^, (mrad)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

time (ms) y_b^, (mrad)

September 95 data taken in flattop 2250MeV/c, y‘ not fitted, 50ms time bins

0

1

2

0 500 1000 1500 2000 2500 3000 3500 4000

δϕ_{FWHM} (deg)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

y_b (mm)

0

2

4

0 500 1000 1500 2000 2500 3000 3500 4000

δx_{b,FWHM} (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b^, (mrad)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

time (ms) y_b^, (mrad)

September 95 data taken in flattop 2250MeV/c, y‘ not fitted, 100ms time bins

0

1

2

0 500 1000 1500 2000 2500 3000 3500 4000

δϕ_{FWHM} (deg)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

y_b (mm)

0

2

4

0 500 1000 1500 2000 2500 3000 3500 4000

δx_{b,FWHM} (mm)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

x_b^, (mrad)

-5

0

5

0 500 1000 1500 2000 2500 3000 3500 4000

time (ms) y_b^, (mrad)