Inhalt

Inhalt

1. Einleitung 1

1.1 �bersicht . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1

1.2 Das EDDA-Experiment . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 4

1.3 Thema . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 8

2. Der experimentelle Datensatz in der elastischen Proton-Proton Streuung 9

2.1 Der unpolarisierte, differentielle Wirkungsquerschnitt dF/dS . . . . . . . . . . . . . 10

2.2 Die V ektoranalysierst�rke A . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 1 1

y

2.3 Die Polarisationskorrelationsparameter A , A , A . . . . . . . . . . . . . . . . . . . . 13

yy xx xz

3. Sensitivit�t von Observablen auf schmale Resonanzen

in Anregungsfunktionsmessungen 17

4. Die Doppelhelix des EDDA-Detektors 21

4.1 Konzeptionelle Anforderungen . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 22

4.2 Die Geometrie der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 23

4.3 Die Simulation der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 27

4.4 Zuf�llige Koinzidenzen in der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . . 33

4.5 Die Konstruktion der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 37

4.5.1 Die T r�gerrohre der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 37

4.5.2 Szintillierende Fasern der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . 39

Inhalt

4.5.3 Die Photomultiplier der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . . . . . 43

4.5.4 Die Front-End Elektronik der Doppelhelix . . . . . . . . . . . . . . . . . . . . . . . 44

5. Vorstudien zum EDDA-Experiment mit einem Szintillationsdetektor 47

5.1 Aufbau der Teleskop/Hodoskop Anordnung . . . . . . . . . . . . . . . . . . . . . . . . . 47

5.2 Messung einer Anregungsfunktion von dF/dS(pp->pp) bei 2 = 42� . . . . . . 52

LAB

5.3 Messung der W inkelverteilung von dF/dS(pp->pp) bei T= 585 MeV . . . . . . . 64

Anhang 73

Anhang A Streuamplituden und Polarisationsobservablen . . . . . . . . . . . . . . . . . . . 73

Anhang B Das PCOS III - System . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . 79

Literatur 82